600 800 1000 1200 1400 1600 1800 0 10 20 30 40 50 60

10% formaldehyde

1040 1126

785 716 849 915 1004 1081

1268 1336 1450

1658

Raman shift (cm^{-1})

Raman intensity (a.u.)

Raman intensity (a.u.)

Treatment time (min)

0 min 20 min 40 min 60 min

B

915 cm^{-1}

785 cm^{-1}

1450 cm^{-1}

1658 cm^{-1} A