10^{-1} 10^0 10^1 10^2 10^3

0.00

0.02

0.04

0.06

0.08

Modulus’’

Frequency [Hz]

T= 300 K 1E-14

1E-13

1E-12

1E-11

1E-10

’[S/cm]

Empty mol. sv. 0.5 nm pore size