3.5 4.0 4.5 5.0 5.5 6.0 6.5 -7 -6 -5 -4 -3 -2 -1 0 1 2 3 4 Hydrated mol. sv. Jansson et al.

Empty mol. sv. (this work)

Log( [s])

1000/T [K^{-1}]