0 5 10 15 20 -10

-8

-6

-4

-2

0

-0.3 -0.2 -0.1 0.0 0.1 0.2 0.3

-200

-100

0

100

200

FC

Temperature (K) ZFC

H=10 Oe

4_{dc} (%)

M(emu mol^{-1})

H (T)

T=1.8 K