0.0 0.2 0.4 0.6 0.8 1.0 0

20

40

60

80

100

120

750 oC_3 h, 9 m^2g^{-1}

700 oC_3 h, 12 m^2g^{-1}

650 oC_3 h, 23 m^2g^{-1}

600 oC_3 h, 33 m^2g^{-1}

V_{ads}, cm^{-3}g^{-1} p/p_0

550 oC_3 h, 55 m^2g^{-1}

BET surface area