0 10 20 30 40 50 60 70

0.000

0.002

0.004

0.006

0.008

0.010

0.012

37 29

33.7

22.8 43.8

18.2

34.5

14.1 27.4

D, nm dV/dD, cm^3/nm g

550 ^oC_3 h 600 ^oC_3 h 650 ^oC_3 h 700 ^oC_3 h 750 ^oC_3 h

8.58