0 25 50

0 25 50

0 25 50

0 25 50

0 25 50

-55 -50 -45 -40 -35 -30 -25 -20 -15 -10 -5 0 5 10 0 25 50

DOS ODOS PDOS of H(1s) z = 4.63 ¯

(I) z = 8.65 ¯

(II) z = 15.14 ¯

DOS (state/eV)

0.0371

0.03326 1.23972

(IV) z = 31.73 ¯

(III) z = 23.87 ¯

0.09502

0.1156 0.21038 0.88598 0.17316

0.40128

Energy (eV)

0.59576

0.573 fermi level at t=0

(V) z = 40.45 ¯