0 25 50

0 25 50

0 25 50

0 25 50

0 25 50

-55 -50 -45 -40 -35 -30 -25 -20 -15 -10 -5 0 5 10 0 25 50

DOS ODOS PDOS of H(1s)

fermi level at t=0

z = 4.63 ¯

0.03698

(I) z = 8.65 ¯

0.77246

DOS (state/eV)

0.15824 0.57392 0.14874

(II) z = 15.14 ¯

(III) z = 23.87¯

0.10672 0.2587 0.55278 0.26044

0.60448 0.3905

(IV) z = 31.73 ¯

(V) z = 40.45 ¯

Energy (eV)

0.61152